1 2 3 4 5 6 7 8 9 10

-5

0

5

Distance = 10 parsecs

Age = 0.1, 0.5, 1.0, 5.0 Gyrs.

J H K M

NICMOS ISO Gemini/SOFIA SIRTF NGST (6m @ 1 A.U.) NGST (6m @ 3 A.U.)